\begin{table}[htbp]
\centering
\caption{DADOS-M7-F1-NU.}
\begin{tabular}{ccccc}
\toprule
$N$ & $l_1$ & $l_{\infty}$ & $p_{E}^{*}$ - $l_1$ & $p_{E}^{*}$ - $l_{\infty}$
\\ \midrule

       641&2.5804094682E-06&5.6989194382E-06&&\\
      1281&1.4277650071E-12&3.1510019880E-12&2.0785410036E+01&2.0786446303E+01\\
      2561&1.5935089052E-19&3.6039956949E-19&2.3095048131E+01&2.3059710041E+01\\
      5121&3.9275085854E-27&9.2105407882E-27&2.5274017411E+01&2.5221736182E+01\\
     10241&1.5476210023E-29&3.4301967868E-29&7.9874184066E+00&8.0688507104E+00\\
     20481&9.4711025877E-30&2.2292061327E-29&7.0844791903E-01&6.2176131715E-01\\
     40961&1.9241503007E-28&3.9130659424E-28&-4.3445452980E+00&-4.1336974899E+00\\
     81921&1.6628968248E-28&4.6967268368E-28&2.1052283773E-01&-2.6335626588E-01\\
    163841&2.0913657479E-27&4.9935003153E-27&-3.6526748255E+00&-3.4103238688E+00\\
\bottomrule
\end{tabular}
%\label{tab:addlabel}
\end{table}
