\begin{table}[htbp]
\centering
\caption{DADOS-M8-F1-NU.}
\begin{tabular}{ccccc}
\toprule
$N$ & $l_1$ & $l_{\infty}$ & $p_{E}^{*}$ - $l_1$ & $p_{E}^{*}$ - $l_{\infty}$
\\ \midrule

      1281&6.4460150785E-07&1.4247322228E-06&&\\
      2561&8.9166067887E-14&1.9693796213E-13&2.2785409430E+01&2.2786446221E+01\\
      5121&2.4879264448E-21&5.6312523398E-21&2.5095047629E+01&2.5059710193E+01\\
     10241&2.4467515448E-30&5.4241890954E-30&2.9921429077E+01&2.9951401181E+01\\
     20481&9.4524821615E-30&2.2276653888E-29&-1.9498256111E+00&-2.0380531669E+00\\
     40961&1.9221735061E-28&3.9122570518E-28&-4.3459015359E+00&-4.1343967136E+00\\
     81921&1.6616119978E-28&4.6970812079E-28&2.1015502932E-01&-2.6376337201E-01\\
    163841&2.0896958822E-27&4.9934171151E-27&-3.6526375557E+00&-3.4101909826E+00\\
\bottomrule
\end{tabular}
%\label{tab:addlabel}
\end{table}
