\begin{table}[htbp]
\centering
\caption{DADOS-M8-F4-NU.}
\begin{tabular}{ccccc}
\toprule
$N$ & $l_1$ & $l_{\infty}$ & $p_{E}^{*}$ - $l_1$ & $p_{E}^{*}$ - $l_{\infty}$
\\ \midrule

      1281&3.8184856315E-07&9.2982940855E-07&&\\
      2561&6.3523850550E-14&1.5568942854E-13&2.2519198894E+01&2.2509863638E+01\\
      5121&2.1991319872E-21&5.4119891853E-21&2.4783860835E+01&2.4777936790E+01\\
     10241&1.3551169595E-29&3.3040483754E-29&2.7273941578E+01&2.7287348906E+01\\
     20481&2.2897709579E-30&6.8078734639E-30&2.5651421750E+00&2.2789586824E+00\\
     40961&5.9359317038E-29&1.3258332849E-28&-4.6961992928E+00&-4.2835513446E+00\\
     81921&8.6426835656E-29&2.3362117634E-28&-5.4200484777E-01&-8.1727167458E-01\\
    163841&8.3679504017E-28&1.9630739108E-27&-3.2753230546E+00&-3.0708715353E+00\\
\bottomrule
\end{tabular}
%\label{tab:addlabel}
\end{table}
