\begin{table}[htbp]
\centering
%\caption{DADOS-FONTE4-NU.}
\caption{Resultados: CRE clássico, Poisson, $T=\dfrac{-1}{5}e^{3x} + 3x + 2$, $m=1$, malha não uniforme.}
\begin{tabular}{ccccc}
\toprule
$N$ & $l_1$ & $l_{\infty}$ & $p_{E}^{*}$ - $l_1$ & $p_{E}^{*}$ - $l_{\infty}$
\\ \midrule
  11&&&&\\
  21&3.1763390255E-05&1.3290107307E-04&&\\
  41&1.9204788015E-06&8.7795832590E-06&4.0478269618E+00&3.9200564822E+00\\
  81&1.1828053191E-07&5.6202804288E-07&4.0211814978E+00&3.9654384390E+00\\
 161&7.3430496571E-09&3.5518884123E-08&4.0096894700E+00&3.9839839536E+00\\
 321&4.5745512824E-10&2.2318120768E-09&4.0046772146E+00&3.9922987986E+00\\
 641&2.8545465389E-11&1.3985371969E-10&4.0022967479E+00&3.9962250235E+00\\
1281&1.7826849576E-12&8.7521867838E-12&4.0011379110E+00&3.9981312879E+00\\
2561&1.1137408060E-13&5.4736428389E-13&4.0005663399E+00&3.9990703221E+00\\
5121&6.9595170548E-15&3.4221264434E-14&4.0002825161E+00&3.9995363286E+00\\
10241&4.3492728699E-16&2.1391723242E-15&4.0001410656E+00&3.9997684559E+00\\
20481&2.7181627275E-17&1.3370899283E-16&4.0000704919E+00&3.9998843009E+00\\
40961&1.6988102172E-18&8.3571470467E-18&4.0000352323E+00&3.9999421686E+00\\
81921&1.0617434229E-19&5.2233215782E-19&4.0000176139E+00&3.9999710885E+00\\
163841&6.6358560179E-21&3.2646085543E-20&4.0000087779E+00&3.9999856075E+00\\
\bottomrule
\end{tabular}
%\label{tab:addlabel}
\end{table}
