\begin{table}[htbp]
\centering
\caption{DADOS-FONTE1-NU.}
\begin{tabular}{ccccc}
\toprule
$N$ & $l_1$ & $l_{\infty}$ & $p_{E}^{*}$ - $l_1$ & $p_{E}^{*}$ - $l_{\infty}$
\\ \midrule

  11&1.4552441397E-02&8.4883644442E-02&&\\
  21&2.7223410557E-03&6.0366300724E-03&2.4183414833E+00&3.8136712991E+00\\
  41&6.5847985783E-04&1.4933315861E-03&2.0476366036E+00&2.0152088512E+00\\
  81&1.6487079986E-04&3.6919079038E-04&1.9978034039E+00&2.0160960737E+00\\
 161&4.1221652053E-05&9.1748459519E-05&1.9998616763E+00&2.0086107248E+00\\
 321&1.0305589439E-05&2.2866930325E-05&1.9999753017E+00&2.0044212247E+00\\
 641&2.5764083893E-06&5.7078641374E-06&1.9999938238E+00&2.0022398099E+00\\
1281&6.4410278687E-07&1.4258513889E-06&1.9999984555E+00&2.0011273722E+00\\
2561&1.6102573984E-07&3.5632317259E-07&1.9999996137E+00&2.0005654093E+00\\
5121&4.0256437656E-08&8.9063310816E-08&1.9999999033E+00&2.0002831604E+00\\
****&1.0064109583E-08&2.2263640976E-08&1.9999999758E+00&2.0001416941E+00\\
****&2.5160274063E-09&5.5656368131E-09&1.9999999939E+00&2.0000708756E+00\\
****&6.2900685225E-10&1.3913708333E-09&1.9999999985E+00&2.0000397848E+00\\
****&1.5725171310E-10&3.4783724504E-10&1.9999999996E+00&2.0000226594E+00\\
****&3.9312928279E-11&8.6958801910E-11&1.9999999999E+00&2.0000084504E+00\\
\bottomrule
\end{tabular}
%\label{tab:addlabel}
\end{table}
